[#BloombergLP-bslmt-TimedCompletionGuard-failByAbort]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/TimedCompletionGuard.adoc[TimedCompletionGuard]::failByAbort
:relfileprefix: ../../../
:mrdocs:

(Default Handler) Emulate the invocation of the standard `assert` macro with a `false` argument, using the expression `text` to generate a helpful output message and then, after logging, unconditionally aborting&period; Note that this handler function is the default installed assertion handler&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;timedcompletionguard&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;noreturn&rsqb;&rsqb;
static
void
failByAbort(char const* text);
----

== Return Value

[NOTE]
====
This function https://en.cppreference.com/cpp/language/attributes/noreturn[does not return^].
====

[.small]#Created with https://www.mrdocs.com[MrDocs]#
