[#BloombergLP-bslmt-ThroughputBenchmarkResult-2constructor-0e]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/ThroughputBenchmarkResult.adoc[ThroughputBenchmarkResult]::ThroughputBenchmarkResult
:relfileprefix: ../../../
:mrdocs:

Create a `ThroughputBenchmarkResult` object having the value of the specified `original`&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;throughputbenchmarkresult&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
ThroughputBenchmarkResult(
    xref:BloombergLP/bslmt/ThroughputBenchmarkResult.adoc[ThroughputBenchmarkResult] const& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
