[#BloombergLP-bslmt-ThreadUtil-sleep-0e]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/ThreadUtil.adoc[ThreadUtil]::sleep
:relfileprefix: ../../../
:mrdocs:

Suspend execution of the current thread for a period of at least the specified (relative) `sleepTime`, or an interrupting signal is received&period; Note that the actual time suspended depends on many factors including system scheduling and system timer resolution&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;threadutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
sleep(xref:BloombergLP/bsls/TimeInterval.adoc[bsls::TimeInterval] const& sleepTime);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
