[#BloombergLP-bslmt-ThreadUtil-isEqualId]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/ThreadUtil.adoc[ThreadUtil]::isEqualId
:relfileprefix: ../../../
:mrdocs:

Return `true` if the specified `lhs` thread identifier is associated with the same thread as the specified `rhs` thread identifier, and `false` otherwise&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;threadutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool
isEqualId(
    xref:BloombergLP/bslmt/ThreadUtil/Id.adoc[Id] const& a,
    xref:BloombergLP/bslmt/ThreadUtil/Id.adoc[Id] const& b);
----

== Description

DEPRECATED&colon; use `areEqualId` instead&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
