[#BloombergLP-bslmt-Latch-clockType]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/Latch.adoc[Latch]::clockType
:relfileprefix: ../../../
:mrdocs:

Return the clock type used for timeouts&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;latch&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsls/SystemClockType/Enum.adoc[bsls::SystemClockType::Enum]
clockType() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
