[#BloombergLP-bslmt-EntryPointFunctorAdapterUtil]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::EntryPointFunctorAdapterUtil
:relfileprefix: ../../
:mrdocs:

Utility functions for `EntryPointFunctorAdapter`&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;entrypointfunctoradapter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct EntryPointFunctorAdapterUtil;
----

== Static Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bslmt/EntryPointFunctorAdapterUtil/allocateAdapter.adoc[`allocateAdapter`] 
| Allocate a new `EntryPointFunctorAdapter` holding copies of the specified `invokable` object and `threadName`, and load the result into the specified `adapter`&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
