[#BloombergLP-bslmt-Configuration-nativeDefaultThreadGuardSize]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/Configuration.adoc[Configuration]::nativeDefaultThreadGuardSize
:relfileprefix: ../../../
:mrdocs:

Return the default thread stack guard size (in bytes) determined by the underlying platform&period; Note that this value reflects semantics, and may be influenced by the choice of platform, environment variables, compiler&sol;linker options, or shell configuration, and may vary somewhat among different platforms&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;configuration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int
nativeDefaultThreadGuardSize();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
