[#BloombergLP-bslmt-ChronoUtil]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::ChronoUtil
:relfileprefix: ../../
:mrdocs:

This `struct` provides a namespace for utility functions that operate on `bsl&colon;&colon;chrono` facilities&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;chronoutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct ChronoUtil;
----

== Member Functions

[cols="1"]
|===
| Name
| xref:BloombergLP/bslmt/ChronoUtil/isMatchingClock-04.adoc[`isMatchingClock`] 
|===


== Static Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bslmt/ChronoUtil/durationToTimeInterval.adoc[`durationToTimeInterval`] 
| Return a `bsls&colon;&colon;TimeInterval` having the value represented by the specified `duration`&period; Unlike the implicit conversion defined from duration defined in `bsls&colon;&colon;TimeInterval`, this conversion handles floating&hyphen;point&hyphen;based durations as well as integral ones&period;
| xref:BloombergLP/bslmt/ChronoUtil/isMatchingClock-01.adoc[`isMatchingClock`] 
| Return `true` if the specified (template parameter) type `CLOCK` matches the specified `clockType`, and `false` otherwise&period;
| xref:BloombergLP/bslmt/ChronoUtil/timedWait-0b.adoc[`timedWait`] 
| `timedWait` overloads
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
