[#BloombergLP-bslmf-Switch-07a1-Type]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmf.adoc[bslmf]::xref:BloombergLP/bslmf/Switch-07a1.adoc[Switch]::Type
:relfileprefix: ../../../
:mrdocs:

This `Type` is an alias to the parameterized `TN`, where `N` is the integral value of the parameterized `t&lowbar;SWITCH&lowbar;SELECTOR`&period; Note that the first type in the list corresponds to `t&lowbar;T0`, not `t&lowbar;T1`&period;

== Synopsis

Declared in `&lt;bslmf&lowbar;switch&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef xref:BloombergLP/bslmf/Nil.adoc[Nil] Type;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
