[#BloombergLP-bslma-operator_not_eq-0a]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` unless the specified `rhs` is a proxy for the specified `lhs`, in which case return `false`&period;

== Synopsis

Declared in `&lt;bslma&lowbar;stdtestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class TYPE&gt;
bool
operator!&equals;(
    xref:BloombergLP/bslma/TestAllocator.adoc[TestAllocator] const* lhs,
    xref:BloombergLP/bslma/StdTestAllocator.adoc[StdTestAllocator&lt;TYPE&gt;] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
