[#BloombergLP-bslma-TestAllocator-setNoAbort]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/TestAllocator.adoc[TestAllocator]::setNoAbort
:relfileprefix: ../../../
:mrdocs:

Set the no&hyphen;abort mode for this test allocator to the specified (boolean) `flagValue`&period; `If flagValue` is `true`, aborting on fatal errors is suppressed, and the functions simply return&period; Diagnostics are not affected&period; Note that the default mode is to abort&period; Also note that this function is provided primarily to enable visual testing of diagnostic messages produced by this component&period;

== Synopsis

Declared in `&lt;bslma&lowbar;testallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setNoAbort(bool flagValue);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
