[#BloombergLP-bslma-TestAllocator-isQuiet]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/TestAllocator.adoc[TestAllocator]::isQuiet
:relfileprefix: ../../../
:mrdocs:

Return `true` if this allocator is currently in quiet mode, and `false` otherwise&period; In quiet mode, messages about mismatched deallocations, overrun&sol;underrun errors, and memory leaks will not be displayed to `stdout` and will not cause the program to abort&period;

== Synopsis

Declared in `&lt;bslma&lowbar;testallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isQuiet() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
