[#BloombergLP-bslma-TestAllocator-isNoAbort]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/TestAllocator.adoc[TestAllocator]::isNoAbort
:relfileprefix: ../../../
:mrdocs:

Return `true` if this allocator is currently in no&hyphen;abort mode, and `false` otherwise&period; In no&hyphen;abort mode all diagnostic messages are printed, but all aborts are suppressed&period; Note that quiet mode implies no&hyphen;abort mode&period;

== Synopsis

Declared in `&lt;bslma&lowbar;testallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isNoAbort() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
