[#BloombergLP-bslma-DeallocatorProctor-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/DeallocatorProctor.adoc[DeallocatorProctor]::reset
:relfileprefix: ../../../
:mrdocs:

Set the specified `memory` as the block of memory to be managed by this proctor&period; The behavior is undefined unless `memory` is non&hyphen;zero and was allocated by the allocator (or pool) supplied at construction&period; Note that this method releases any previously&hyphen;managed memory from management (without deallocating it), and so may be invoked with or without having called `release` when reusing this object&period;

== Synopsis

Declared in `&lt;bslma&lowbar;deallocatorproctor&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset(void* memory);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
