[#BloombergLP-bslfmt-TestSpecificationGenerator-setup]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/TestSpecificationGenerator.adoc[TestSpecificationGenerator]::setup
:relfileprefix: ../../../
:mrdocs:

Setup the sequence of this object&apos;s states based on the optionally specified `instruction`&period;

== Synopsis

Declared in `&lt;bslfmt&lowbar;testspecificationgenerator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setup(char const* instruction = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
