[#BloombergLP-bslfmt-TestSpecificationGenerator-isPrecisionOptionPresent]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/TestSpecificationGenerator.adoc[TestSpecificationGenerator]::isPrecisionOptionPresent
:relfileprefix: ../../../
:mrdocs:

Return `true` if the precision option is present in the current state of this object, and `false` otherwise&period;

== Synopsis

Declared in `&lt;bslfmt&lowbar;testspecificationgenerator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isPrecisionOptionPresent() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
