[#BloombergLP-bdlt-TimeUtil-convertToHHMMSS]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/TimeUtil.adoc[TimeUtil]::convertToHHMMSS
:relfileprefix: ../../../
:mrdocs:

Return the non&hyphen;negative integer representing the same time as the specified `value` that, when expressed in decimal notation, contains exactly six digits (counting leading zeros, if any)&colon; two digits for the hour, two digits for the minute, and two digits for the second&period; For example, `Time(3, 9, 7, ms)`, where `0 &lt;&equals; ms &lt; 1000`, is converted to 30907&period; More formally, this method returns&colon; &grave; value&period;hour() &ast; 10000 &plus; value&period;minute() &ast; 100 &plus; value&period;second() &grave;

== Synopsis

Declared in `&lt;bdlt&lowbar;timeutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int
convertToHHMMSS(xref:BloombergLP/bdlt/Time.adoc[Time] const& value);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
