[#BloombergLP-bdlt-Literal_SpecifierFormatter-totalWidth]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/Literal_SpecifierFormatter.adoc[Literal&lowbar;SpecifierFormatter]::totalWidth
:relfileprefix: ../../../
:mrdocs:

Return the total width of the output anticipated from all the previous calls to `parseNextSpecifier`&period;

== Synopsis

Declared in `&lt;bdlt&lowbar;literal&lowbar;specifierformatter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
totalWidth() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
