[#BloombergLP-bdlt-Iso8601Util-generate-05b]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/Iso8601Util.adoc[Iso8601Util]::generate
:relfileprefix: ../../../
:mrdocs:

Write the ISO 8601 representation of the specified `object` to the specified `stream`&period; Optionally specify a `configuration` to affect the format of the generated string&period; If `configuration` is not supplied, the process&hyphen;wide default value `Iso8601UtilConfiguration&colon;&colon;defaultConfiguration()` is used&period; Return a reference to `stream`&period; Note that `stream` is not null terminated&period;

== Synopsis

Declared in `&lt;bdlt&lowbar;iso8601util&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
std::ostream&
generate(
    std::ostream& stream,
    xref:BloombergLP/bsls/TimeInterval.adoc[bsls::TimeInterval] const& object);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
