[#BloombergLP-bdlt-FixUtilConfiguration-setDefaultConfiguration]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/FixUtilConfiguration.adoc[FixUtilConfiguration]::setDefaultConfiguration
:relfileprefix: ../../../
:mrdocs:

Set the value of the process&hyphen;wide `FixUtilConfiguration` to the specified `configuration`&period; Note that the expected usage is that the process&hyphen;wide configuration will be established _once_, early in `main`, and not changed throughout the lifetime of a process&period;

== Synopsis

Declared in `&lt;bdlt&lowbar;fixutilconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
setDefaultConfiguration(xref:BloombergLP/bdlt/FixUtilConfiguration.adoc[FixUtilConfiguration] const& configuration);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
