[#BloombergLP-bdlt-DatetimeInterval-totalMicroseconds]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlt.adoc[bdlt]::xref:BloombergLP/bdlt/DatetimeInterval.adoc[DatetimeInterval]::totalMicroseconds
:relfileprefix: ../../../
:mrdocs:

Return the value of this time interval as an integral number of microseconds&period; The behavior is undefined unless the number of microseconds can be represented with a 64&hyphen;bit signed integer&period; Note that the return value may be negative&period;

== Synopsis

Declared in `&lt;bdlt&lowbar;datetimeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsls/Types/Int64.adoc[bsls::Types::Int64]
totalMicroseconds() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
