[#BloombergLP-bdlsta-Moment-0a-kurtosisIfValid]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlsta.adoc[bdlsta]::xref:BloombergLP/bdlsta/Moment-0a.adoc[Moment&lt;BloombergLP&colon;&colon;bdlsta&colon;&colon;MomentLevel&colon;&colon;e&lowbar;M3&gt;]::kurtosisIfValid
:relfileprefix: ../../../
:mrdocs:

Load into the specified `result`, the kurtosis of the data set&period; Return 0 on success, and a non&hyphen;zero value otherwise&period; Specifically, `e&lowbar;INADEQUATE&lowbar;DATA` is returned if `4 &gt; count` or the variance is zero&period;

== Synopsis

Declared in `&lt;bdlsta&lowbar;moment&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
kurtosisIfValid(double* result) const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
