[#BloombergLP-bdlsb-FixedMemOutput-capacity]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlsb.adoc[bdlsb]::xref:BloombergLP/bdlsb/FixedMemOutput.adoc[FixedMemOutput]::capacity
:relfileprefix: ../../../
:mrdocs:

Return the size in bytes of the buffer held by this stream buffer&period;

== Synopsis

Declared in `&lt;bdlsb&lowbar;fixedmemoutput&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::streamsize
capacity() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
