[#BloombergLP-bdlsb-FixedMemInput-2constructor]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlsb.adoc[bdlsb]::xref:BloombergLP/bdlsb/FixedMemInput.adoc[FixedMemInput]::FixedMemInput
:relfileprefix: ../../../
:mrdocs:

Create a `FixedMemInput` using the specified `buffer` of the specified `length`&period; The position indicator is set to the beginning of the `buffer`&period; The behavior is undefined unless `buffer !&equals; 0 &amp;&amp; length &gt; 0` or `length &equals;&equals; 0`&period; Note that `buffer` is held but not owned&period;

== Synopsis

Declared in `&lt;bdlsb&lowbar;fixedmeminput&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
FixedMemInput(
    char const* buffer,
    std::size&lowbar;t length);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
