[#BloombergLP-bdlmt-SignalerConnectionGuard-waitOnDisconnect]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/SignalerConnectionGuard.adoc[SignalerConnectionGuard]::waitOnDisconnect
:relfileprefix: ../../../
:mrdocs:

Return a `bool` that indicates the value that determines whether the slot, if any, managed by this object will be disconnected using `disconnect` or `disconnectAndWait`&period; Throws nothing&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;signaler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
waitOnDisconnect() const noexcept;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
