[#BloombergLP-bdlmt-FixedThreadPool-stop]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/FixedThreadPool.adoc[FixedThreadPool]::stop
:relfileprefix: ../../../
:mrdocs:

Disable enqueuing jobs on this thread pool, wait until all active and pending jobs complete, and join all processing threads&period; If the thread pool was not already started (`isStarted()` is `false`), this method has no effect&period; At the completion of this method, `false &equals;&equals; isStarted()`&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;fixedthreadpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
stop();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
