[#BloombergLP-bdlma-ConcurrentFixedPool-backoffLevel]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlma.adoc[bdlma]::xref:BloombergLP/bdlma/ConcurrentFixedPool.adoc[ConcurrentFixedPool]::backoffLevel
:relfileprefix: ../../../
:mrdocs:

Return the non&hyphen;negative `backoffLevel` that controls the amount of spinning that occurs when calls to this pool encounter contention&period;

== Synopsis

Declared in `&lt;bdlma&lowbar;concurrentfixedpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
backoffLevel() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
