[#BloombergLP-bdlma-BufferManager-release]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlma.adoc[bdlma]::xref:BloombergLP/bdlma/BufferManager.adoc[BufferManager]::release
:relfileprefix: ../../../
:mrdocs:

Release all memory currently allocated through this buffer manager&period; After this call, the external buffer managed by this object is retained&period; Subsequent allocations will allocate memory from the beginning of the external buffer (if any)&period;

== Synopsis

Declared in `&lt;bdlma&lowbar;buffermanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
release();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
