[#BloombergLP-bdlm-operator_not_eq-0d]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlm.adoc[bdlm]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Inequality operators

== Synopses

Declared in `&lt;bdlm&lowbar;metric&period;h&gt;`

Return `true` if the specified `lhs` and `rhs` objects do not have the same value, and `false` otherwise&period; Two `MetricDescriptor` objects do not have the same value if any of their attributes (respectively) do not have the same value&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
xref:BloombergLP/bdlm/operator_not_eq-03.adoc[operator!&equals;](
    xref:BloombergLP/bdlm/MetricDescriptor.adoc[MetricDescriptor] const& lhs,
    xref:BloombergLP/bdlm/MetricDescriptor.adoc[MetricDescriptor] const& rhs);
----

[.small]#xref:BloombergLP/bdlm/operator_not_eq-03.adoc[_» more&period;&period;&period;_]#

Return `true` if the specified `lhs` command&hyphen;line metric has a different value from the specified `rhs` command&hyphen;line metric, and `false` otherwise&period; Two `Metric` objects do not have the same value if their types are not the same or they have different values&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
xref:BloombergLP/bdlm/operator_not_eq-06.adoc[operator!&equals;](
    xref:BloombergLP/bdlm/Metric.adoc[Metric] const& lhs,
    xref:BloombergLP/bdlm/Metric.adoc[Metric] const& rhs);
----

[.small]#xref:BloombergLP/bdlm/operator_not_eq-06.adoc[_» more&period;&period;&period;_]#


[.small]#Created with https://www.mrdocs.com[MrDocs]#
