[#BloombergLP-bdlm-MetricDescriptor-2constructor-0c]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlm.adoc[bdlm]::xref:BloombergLP/bdlm/MetricDescriptor.adoc[MetricDescriptor]::MetricDescriptor
:relfileprefix: ../../../
:mrdocs:

Create an object of this class having the same value as the specified `original` one&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Synopsis

Declared in `&lt;bdlm&lowbar;metricdescriptor&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
MetricDescriptor(
    xref:BloombergLP/bdlm/MetricDescriptor.adoc[MetricDescriptor] const& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
