[#BloombergLP-bdlm-Metric-isGauge]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlm.adoc[bdlm]::xref:BloombergLP/bdlm/Metric.adoc[Metric]::isGauge
:relfileprefix: ../../../
:mrdocs:

Return `true` if the value of this metric is of gauge type, and `false` otherwise&period;

== Synopsis

Declared in `&lt;bdlm&lowbar;metric&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isGauge() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
