[#BloombergLP-bdldfp-operator_rshift-04]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdldfp.adoc[bdldfp]::operator&gt;&gt;
:relfileprefix: ../../
:mrdocs:

Return an `Uint128` value equal to the value of a bitwise right shift of the specified `lhs` 128&hyphen;bit integer shifted by the specified `rhs` value&period; The behavior is undefined unless `0 &lt;&equals; rhs &lt; 128`&period;

== Synopsis

Declared in `&lt;bdldfp&lowbar;uint128&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bdldfp/Uint128.adoc[bdldfp::Uint128]
operator&gt;&gt;(
    xref:BloombergLP/bdldfp/Uint128.adoc[Uint128] lhs,
    int rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
