[#BloombergLP-bdldfp-DecimalUtil-quantizeEqual-0c]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdldfp.adoc[bdldfp]::xref:BloombergLP/bdldfp/DecimalUtil.adoc[DecimalUtil]::quantizeEqual
:relfileprefix: ../../../
:mrdocs:

Same as the overload taking `Decimal32`&period;

== Synopsis

Declared in `&lt;bdldfp&lowbar;decimalutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int
quantizeEqual(
    xref:BloombergLP/bdldfp/Decimal64.adoc[Decimal64]* x,
    xref:BloombergLP/bdldfp/Decimal64.adoc[Decimal64] y,
    int exponent);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
