[#BloombergLP-bdldfp-DecimalImpUtil-checkLiteral-0f]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdldfp.adoc[bdldfp]::xref:BloombergLP/bdldfp/DecimalImpUtil.adoc[DecimalImpUtil]::checkLiteral
:relfileprefix: ../../../
:mrdocs:

Overload to avoid an error when the decimal floating&hyphen;point literal (without the suffix) can be interpreted as a `double` literal&period;

== Synopsis

Declared in `&lt;bdldfp&lowbar;decimalimputil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
checkLiteral(double);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
