[#BloombergLP-bdldfp-DecimalConvertUtil-decimal128ToFloat]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdldfp.adoc[bdldfp]::xref:BloombergLP/bdldfp/DecimalConvertUtil.adoc[DecimalConvertUtil]::decimal128ToFloat
:relfileprefix: ../../../
:mrdocs:

DEPRECATED&colon; Use `deciamalToFloat` instead&period;

== Synopsis

Declared in `&lt;bdldfp&lowbar;decimalconvertutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
float
decimal128ToFloat(xref:BloombergLP/bdldfp/Decimal128.adoc[Decimal128] decimal);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
