[#BloombergLP-bdldfp-DecimalConvertUtil-decimal128FromDPD-0f]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdldfp.adoc[bdldfp]::xref:BloombergLP/bdldfp/DecimalConvertUtil.adoc[DecimalConvertUtil]::decimal128FromDPD
:relfileprefix: ../../../
:mrdocs:

`decimal128FromDPD` overloads

== Synopses

Declared in `&lt;bdldfp&lowbar;decimalconvertutil&period;h&gt;`

Return the native implementation representation of the value of the same size base&hyphen;10 floating&hyphen;point value stored in Densely Packed Decimal format at the specified `buffer` address&period; The behavior is undefined unless `buffer` points to a memory area at least `sizeof(decimal)` in size containing a value in DPD format&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bdldfp/Decimal128.adoc[Decimal128]
xref:BloombergLP/bdldfp/DecimalConvertUtil/decimal128FromDPD-0a.adoc[decimal128FromDPD](unsigned char const* buffer);
----

[.small]#xref:BloombergLP/bdldfp/DecimalConvertUtil/decimal128FromDPD-0a.adoc[_» more&period;&period;&period;_]#

Same as the overload taking `Decimal32`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
xref:BloombergLP/bdldfp/DecimalConvertUtil/decimal128FromDPD-09.adoc[decimal128FromDPD](
    xref:BloombergLP/bdldfp/Decimal128.adoc[Decimal128]* decimal,
    unsigned char const* buffer);
----

[.small]#xref:BloombergLP/bdldfp/DecimalConvertUtil/decimal128FromDPD-09.adoc[_» more&period;&period;&period;_]#


[.small]#Created with https://www.mrdocs.com[MrDocs]#
