[#BloombergLP-bdlde-Utf8Util-toAscii]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/Utf8Util.adoc[Utf8Util]::toAscii
:relfileprefix: ../../../
:mrdocs:

Return the non&hyphen;modifiable string representation of the `ErrorStatus` enumerator matching the specified `value`, if it exists, and &quot;(&ast; unrecognized value &ast;)&quot; otherwise&period; The string representation of an enumerator that matches `value` is the enumerator name with the &quot;k&lowbar;&quot; prefix elided&period; Note that this method may be used to aid in interpreting status values that are returned from some methods in this utility&period; See `ErrorStatus`&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;utf8util&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
char const*
toAscii(xref:BloombergLP/bdlde/Utf8Util/IntPtr.adoc[IntPtr] value);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
