[#BloombergLP-bdlde-Utf8CheckingInStreamBufWrapper-toAscii]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/Utf8CheckingInStreamBufWrapper.adoc[Utf8CheckingInStreamBufWrapper]::toAscii
:relfileprefix: ../../../
:mrdocs:

Return a description of the specified `errorStatus`&period; Note that `errorStatus` is either&colon; &ast; `k&lowbar;SEEK&lowbar;FAIL` &ast; A value from `Utf8Util&colon;&colon;ErrorStatus`, which are all negative, in the case of invalid UTF&hyphen;8&period; &ast; 0 if no errors have occurred, in which case `NO&lowbar;ERROR` will be returned&period; Note that this includes the case where end of file has been reached without any error occurring&period; &ast; If `errorStatus` is an invalid value, &quot;(&ast; unrecognized value &ast;)&quot; will be returned&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;utf8checkinginstreambufwrapper&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
char const*
toAscii(int errorStatus);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
