[#BloombergLP-bdlde-Utf8CheckingInStreamBufWrapper-2constructor-059]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/Utf8CheckingInStreamBufWrapper.adoc[Utf8CheckingInStreamBufWrapper]::Utf8CheckingInStreamBufWrapper
:relfileprefix: ../../../
:mrdocs:

Create a `Utf8StreamBufInputWrapper` object having no associated `streambuf`&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0 or not specified, the currently installed default allocator is used&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;utf8checkinginstreambufwrapper&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
Utf8CheckingInStreamBufWrapper();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
