[#BloombergLP-bdlde-QuotedPrintableEncoder-outputLength]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/QuotedPrintableEncoder.adoc[QuotedPrintableEncoder]::outputLength
:relfileprefix: ../../../
:mrdocs:

Return the total length of the output emitted by this encoder (possibly after one or more calls to the `convert` or the `input` methods) since its initial construction or the latest `reset`&period; Note that soft line breaks are included in the counts if added&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;quotedprintableencoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
outputLength() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
