[#BloombergLP-bdlde-HexEncoder]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::HexEncoder
:relfileprefix: ../../
:mrdocs:

This class implements a mechanism capable of converting data of arbitrary length to its corresponding Hex representation&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;hexencoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
class HexEncoder;
----

== Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bdlde/HexEncoder/2constructor.adoc[`HexEncoder`]         [.small]#[constructor]#
| Create a Hex encoder in the initial state&period; Optionally specify the `upperCaseLetters` to indicate if values from 10 to 15 are encoded as uppercase letters(`A`&hyphen;`F`) or as lowercase letters(`a`&hyphen;`f`)&period;
| xref:BloombergLP/bdlde/HexEncoder/convert-06.adoc[`convert`] 
| Append to the buffer addressed by the specified `out` pending character (if there is such) up to the optionally specified `maxNumOut` limit (default is negative, meaning no limit)&period; When there is no pending output and `maxNumOut` is still not reached, begin to consume and encode a sequence of input characters starting at the specified `begin` position, up to but not including the specified `end` position&period; Any resulting output is written to the `out` buffer up to the (cumulative) `maxNumOut` limit&period; If `maxNumOut` limit is reached, no further input will be consumed&period; Load into the (optionally) specified `numOut` and `numIn` the number of output bytes produced and input bytes consumed, respectively&period; Return a non&hyphen;negative value on success and a negative value otherwise&period; A successful return status indicates the number of characters that would be output if `endConvert` were called subsequently with no output limit&period; These bytes _may_ be available for output if this method is called with a sufficiently large `maxNumOut`&period; Note that calling this method after `endConvert` has been invoked without an intervening `reset` call will place this instance in an error state, and return an error status&period; Note also that it is recommended that after all calls to `convert` are finished, the `endConvert` method be called to complete the encoding of any unprocessed input characters&period;
| xref:BloombergLP/bdlde/HexEncoder/endConvert-05.adoc[`endConvert`] 
| `endConvert` overloads
| xref:BloombergLP/bdlde/HexEncoder/isAcceptable.adoc[`isAcceptable`] 
| Return `true` if the input read so far by this encoder is considered syntactically complete, and `false` otherwise&period;
| xref:BloombergLP/bdlde/HexEncoder/isDone.adoc[`isDone`] 
| Return `true` if this encoder is in the done state (i&period;e&period;, `endConvert` has been called and any additional input will result in an error), and if there is no pending output, and `false` otherwise&period;
| xref:BloombergLP/bdlde/HexEncoder/isError.adoc[`isError`] 
| Return `true` if there is no possibility of achieving an &quot;acceptable&quot; result, and `false` otherwise&period; Note that for an encoder, no input can cause an error&semi; the possible errors result either from a call to the `convert` method after the `endConvert` method is called the first time, or from a call to the `endConvert` method after the `endConvert` method has returned successfully&period;
| xref:BloombergLP/bdlde/HexEncoder/isInitialState.adoc[`isInitialState`] 
| Return `true` if this encoder is in the initial state (i&period;e&period;, as if no input had been consumed), and `false` otherwise&period;
| xref:BloombergLP/bdlde/HexEncoder/isUpperCase.adoc[`isUpperCase`] 
| Return `true` if this encoder represents values from 10 to 15 as uppercase letters(`A`&hyphen;`F`), and `false` if these values are represented as lowercase letters(`a`&hyphen;`f`)&period;
| xref:BloombergLP/bdlde/HexEncoder/numOutputPending.adoc[`numOutputPending`] 
| Return the number of characters that would be output if `endConvert` were called with no output limit&period;
| xref:BloombergLP/bdlde/HexEncoder/outputLength.adoc[`outputLength`] 
| Return the total length of the output emitted by this encoder (possibly after one or more calls to the `convert` or the `input` methods) since its initial construction or the latest `reset`&period;
| xref:BloombergLP/bdlde/HexEncoder/reset.adoc[`reset`] 
| Reset this encoder to its initial state (i&period;e&period;, as if no input had been consumed)&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
