[#BloombergLP-bdlde-HexDecoder-convert-09]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/HexDecoder.adoc[HexDecoder]::convert
:relfileprefix: ../../../
:mrdocs:

Append to the buffer addressed by the specified `out` all pending output (if there is any) up to the optionally specified `maxNumOut` limit (default is negative, meaning no limit)&period; When there is no pending output and the `maxNumOut` is still not reached, begin to consume and decode a sequence of input characters starting at the specified `begin` position, up to but not including the specified `end` position&period; Any resulting output is written to the `out` buffer up to the (cumulative) `maxNumOut` limit&period; If `maxNumOut` limit is reached, no further input will be consumed&period; Load into the (optionally) specified `numOut` and `numIn` the number of output bytes produced and input bytes consumed, respectively&period; Return 0 on success and a negative value otherwise&period; Note that calling this method after `endConvert` has been invoked without an intervening `reset` call will place this instance in an error state, and return an error status&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;hexdecoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;
    class OUTPUT&lowbar;ITERATOR,
    class INPUT&lowbar;ITERATOR&gt;
int
convert(
    OUTPUT&lowbar;ITERATOR out,
    INPUT&lowbar;ITERATOR begin,
    INPUT&lowbar;ITERATOR end);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
