[#BloombergLP-bdlde-Base64EncoderOptions-standard]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/Base64EncoderOptions.adoc[Base64EncoderOptions]::standard
:relfileprefix: ../../../
:mrdocs:

Return a `Base64EncoderOptions` object having the attributes `maxLineLength &equals;&equals; 0`, `alphabet &equals;&equals; Base64Alphabet&colon;&colon;e&lowbar;BASIC`, and `isPadded &equals;&equals; false`&period; If `padded` is not specified, it defaults to `true`&period; This conforms to RFC 4648 section 4&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;base64encoderoptions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bdlde/Base64EncoderOptions.adoc[Base64EncoderOptions]
standard(bool padded = true);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
