[#BloombergLP-bdlde-Base64Encoder-encodedLength-05]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/Base64Encoder.adoc[Base64Encoder]::encodedLength
:relfileprefix: ../../../
:mrdocs:

Return the exact number of encoded bytes that would result from an input byte sequence of the specified `inputLength` provided to the `convert` method of an encoder configured with the specified `maxLineLength`&period; The behavior is undefined unless `0 &lt;&equals; inputLength` and `0 &lt;&equals; maxLineLength`&period; Note that if `maxLineLength` is 0, no CRLF characters will appear in the output&period; Note also that the number of encoded bytes need not be the number of _output_ bytes&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;base64encoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int
encodedLength(
    int inputLength,
    int maxLineLength);
----

== Description

DEPRECATED&colon; use the overload with `options` instead&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
