[#BloombergLP-bdld-DatumArrayBuilder-get_allocator]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdld.adoc[bdld]::xref:BloombergLP/bdld/DatumArrayBuilder.adoc[DatumArrayBuilder]::get&lowbar;allocator
:relfileprefix: ../../../
:mrdocs:

Return the allocator used by this object to supply memory&period; Note that if no allocator was supplied at construction the default allocator in effect at construction is used&period;

== Synopsis

Declared in `&lt;bdld&lowbar;datumarraybuilder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bdld/DatumArrayBuilder/allocator_type.adoc[DatumArrayBuilder::allocator&lowbar;type]
get&lowbar;allocator() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
