[#BloombergLP-bdlcc-TimeQueue-091-2constructor-00b]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlcc.adoc[bdlcc]::xref:BloombergLP/bdlcc/TimeQueue-091.adoc[TimeQueue&lt;function&lt;void()&gt;&gt;]::TimeQueue
:relfileprefix: ../../../
:mrdocs:

Create an empty time queue&period; Optionally specify `numIndexBits` to configure the number of index bits used by this object&period; If `numIndexBits` is not specified a default value of 17 is used&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; The behavior is undefined unless `8 &lt;&equals; numIndexBits &lt;&equals; 24`&period; See the component&hyphen;level documentation for more information regarding `numIndexBits`&period;

== Synopsis

Declared in `&lt;bdlcc&lowbar;timequeue&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
TimeQueue(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
