[#BloombergLP-bdlcc-Queue-2constructor-09]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlcc.adoc[bdlcc]::xref:BloombergLP/bdlcc/Queue.adoc[Queue]::Queue
:relfileprefix: ../../../
:mrdocs:

Create a queue of objects of parameterized `TYPE` containing the sequence of `TYPE` values from the specified `srcQueue` and having either the specified `highWaterMark` suggested maximum length if `highWaterMark` is positive, or no maximum length if `highWaterMark` is negative&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; The behavior is undefined unless `highWaterMark !&equals; 0`&period;

== Synopsis

Declared in `&lt;bdlcc&lowbar;queue&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
Queue(
    xref:BloombergLP/bdlc/Queue.adoc[bdlc::Queue&lt;TYPE&gt;] const& srcQueue,
    int highWaterMark,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
