[#BloombergLP-bdlcc-Queue-2constructor-07]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlcc.adoc[bdlcc]::xref:BloombergLP/bdlcc/Queue.adoc[Queue]::Queue
:relfileprefix: ../../../
:mrdocs:

Constructors

== Synopses

Declared in `&lt;bdlcc&lowbar;queue&period;h&gt;`

Create a queue of objects of parameterized `TYPE`&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
xref:BloombergLP/bdlcc/Queue/2constructor-030.adoc[Queue](xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/bdlcc/Queue/2constructor-030.adoc[_» more&period;&period;&period;_]#

Create a queue of objects of parameterized `TYPE` having either the specified `highWaterMark` suggested maximum length if `highWaterMark` is positive, or no maximum length if `highWaterMark` is negative&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; The behavior is undefined unless `highWaterMark !&equals; 0`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
xref:BloombergLP/bdlcc/Queue/2constructor-01.adoc[Queue](
    int highWaterMark,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/bdlcc/Queue/2constructor-01.adoc[_» more&period;&period;&period;_]#

Create a queue of objects of parameterized `TYPE` with sufficient initial capacity to accommodate up to the specified `numItems` values without subsequent reallocation&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
xref:BloombergLP/bdlcc/Queue/2constructor-039.adoc[Queue](
    xref:BloombergLP/bdlcc/Queue/InitialCapacity.adoc[InitialCapacity] const& numItems,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/bdlcc/Queue/2constructor-039.adoc[_» more&period;&period;&period;_]#

Create a queue of objects of parameterized `TYPE` containing the sequence of `TYPE` values from the specified `srcQueue`&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bdlcc/Queue/2constructor-08.adoc[Queue](
    xref:BloombergLP/bdlc/Queue.adoc[bdlc::Queue&lt;TYPE&gt;] const& srcQueue,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/bdlcc/Queue/2constructor-08.adoc[_» more&period;&period;&period;_]#

Create a queue of objects of parameterized `TYPE` with sufficient initial capacity to accommodate up to the specified `numItems` values without subsequent reallocation and having either the specified `highWaterMark` suggested maximum length if `highWaterMark` is positive, or no maximum length if `highWaterMark` is negative&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; The behavior is undefined unless `highWaterMark !&equals; 0`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bdlcc/Queue/2constructor-0d.adoc[Queue](
    xref:BloombergLP/bdlcc/Queue/InitialCapacity.adoc[InitialCapacity] const& numItems,
    int highWaterMark,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/bdlcc/Queue/2constructor-0d.adoc[_» more&period;&period;&period;_]#

Create a queue of objects of parameterized `TYPE` containing the sequence of `TYPE` values from the specified `srcQueue` and having either the specified `highWaterMark` suggested maximum length if `highWaterMark` is positive, or no maximum length if `highWaterMark` is negative&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; The behavior is undefined unless `highWaterMark !&equals; 0`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bdlcc/Queue/2constructor-09.adoc[Queue](
    xref:BloombergLP/bdlc/Queue.adoc[bdlc::Queue&lt;TYPE&gt;] const& srcQueue,
    int highWaterMark,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/bdlcc/Queue/2constructor-09.adoc[_» more&period;&period;&period;_]#


[.small]#Created with https://www.mrdocs.com[MrDocs]#
