[#BloombergLP-bdlcc-FixedQueueIndexManager-_04enum]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlcc.adoc[bdlcc]::xref:BloombergLP/bdlcc/FixedQueueIndexManager.adoc[FixedQueueIndexManager]::Unnamed enum
:relfileprefix: ../../../
:mrdocs:

Capacity&hyphen;related constants for this index manager&period;

== Synopsis

Declared in `&lt;bdlcc&lowbar;fixedqueueindexmanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Unnamed enum;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `k&lowbar;MAX&lowbar;CAPACITY` 
| Maximum capacity of an index manager&semi; note that 2 bits of `d&lowbar;pushIndex` are reserved for holding the disabled status flag, and ensuring that the representable number of generation counts is at least 2 (see the implementation note in the &period;cpp for more details)&period;
| `e&lowbar;MAX&lowbar;CAPACITY` 
| Deprecated alias for `k&lowbar;MAX&lowbar;CAPACITY`&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
