[#BloombergLP-bdlcc-Deque-maxSizeT]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlcc.adoc[bdlcc]::xref:BloombergLP/bdlcc/Deque.adoc[Deque]::maxSizeT
:relfileprefix: ../../../
:mrdocs:

Return the maximum value that can be stored in a veriable of type `size&lowbar;type`&period; The high water mark defaults to having this value&period;

== Synopsis

Declared in `&lt;bdlcc&lowbar;deque&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bdlcc/Deque/size_type.adoc[Deque&lt;TYPE&gt;::size&lowbar;type]
maxSizeT();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
